<script setup lang="ts">

</script>

<template>
    <div class="tooltip-rows">
        <slot />
    </div>
</template>

<style scoped>
.tooltip-rows {
    display: flex;
    flex-direction: column;
    gap: 0.3rem;
}
</style>
